
  This field contains the printer codes for   
setting line feeds to half their normal 
height.  These codes are used to control the
printer during compressed printing (smaller
sized printing).  The default is set up for
an old-style Epson compatible printer, and
the default ASCII values are 27 65 5.

  If you want to change the values, simply
type your new ASCII values into the field,
separated by spaces.

  If you are unsure of the correct settings,
please check your printer manual.  For most
printers the codes for compressed superscript
will work.

  Use your arrow keys to move from this field 
to the next field you wish to edit, or hit
the Escape key to save your changes and then
quit out of the Printer Configuration Menu.
 
  If you need help beyond what is provided here,
please call our Helpline at 617-674-2359 during
regular business hours, and we will be happy to
assist you.


END OF FILE - HIT ESCAPE KEY TO EXIT
